<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"># $FreeBSD$

#
# Note: Whenever bumping the FBSD version, always make
#       FBSDprivate_1.0 depend on the new FBSD version.
#       This will keep it at the end of the dependency chain.
#

# This is our first version; it depends on no other.
# This version was first added to 7.0-current.
FBSD_1.0 {
};

# This version was first added to 8.0-current.
FBSD_1.1 {
} FBSD_1.0;

# This version was first added to 9.0-current.
FBSD_1.2 {
} FBSD_1.1;

# This version was first added to 10.0-current.
FBSD_1.3 {
} FBSD_1.2;

# This version was first added to 11.0-current.
FBSD_1.4 {
} FBSD_1.3;


# This is our private namespace.  Any global interfaces that are
# strictly for use only by other FreeBSD applications and libraries
# are listed here.  We use a separate namespace so we can write
# simple ABI-checking tools.
#
# Please do NOT increment the version of this namespace.
FBSDprivate_1.0 {
} FBSD_1.4;
</pre></body></html>